1775004556005
19358,3.0.19
19357,3.0.18
6357,4.4.0
12,4.8.0
14,4.7.0
17603,4.5.0
17896,3.0.46
15,4.6.0
9654,3.0.42
8178,3.0.19
5103,3.0.36
19368,3.0.11
19371,3.0.12
24322,4.3.0
19367,3.0.10
21964,3.0.6
24222,3.0.38
24122,3.0.40
19373,3.0.13
19370,3.0.14
88,3.0.33
18012,3.0.44
20479,3.0.19
24119,3.0.42
18003,3.0.44
24125,3.0.42
1310,3.0.25
18004,3.0.44
24123,3.0.42
18005,3.0.44
24118,3.0.42
24126,3.0.42
9603,3.0.42
18010,3.0.44
9605,3.0.42
9602,3.0.42
11633,4.4.0
19001,4.10.0
18007,3.0.42
12030,4.8.0
20672,3.0.44
10391,4.4.0
20857,4.11.0
12056,3.0.7
12048,3.0.6
12049,3.0.3
12050,3.0.4
18987,3.0.38
3831,3.0.42
12053,3.0.9
13640,3.0.25
23247,4.11.0
12055,3.0.8
3300,3.0.48
11966,3.0.38
3302,3.0.46
3301,3.0.46
20358,3.0.42
18444,3.0.48
1035,4.11.0
5156,3.0.19
8185,3.0.29
18298,3.0.44
18294,3.0.44
6819,4.8.0
23675,3.0.46
18296,3.0.44
18297,3.0.44
9784,3.0.36
20803,4.2.0
6,4.9.0
12418,4.7.0
207,3.0.19
10864,4.3.0
13527,4.2.0
17993,3.0.25
4866,3.0.6
3776,4.11.0
23972,3.0.38
23970,3.0.38
23974,3.0.38
23952,3.0.38
7974,3.0.42
11417,3.0.38
22963,3.0.41
18705,3.0.44
18867,3.0.42
18866,3.0.42
338,3.0.42
3289,3.0.48
18407,4.10.0
18408,4.10.0
11274,4.6.0
231,3.0.6
4062,3.0.38
19418,3.0.40
4060,3.0.38
15933,3.0.38
19423,3.0.41
4064,3.0.42
9493,4.2.0
4061,3.0.41
19428,3.0.45
19425,3.0.42
24293,4.10.0
19420,3.0.43
19427,3.0.48
15780,4.7.0
8634,4.11.0
19429,3.0.46
19426,3.0.47
19433,3.0.39
7919,3.0.35
10808,3.0.38
13763,4.5.0
5151,3.0.42
19442,3.0.30
19441,3.0.33
19446,3.0.34
19443,3.0.31
19440,3.0.32
18659,3.0.48
19445,3.0.37
19431,3.0.38
19448,3.0.35
21443,4.6.0
19444,3.0.36
17633,3.0.44
19343,3.0.28
17634,3.0.44
19341,3.0.29
8725,4.11.0
13723,4.4.0
13724,4.3.0
13727,4.2.0
23961,3.0.41
6989,4.9.0
22674,3.0.48
11636,4.5.0
155,3.0.46
15462,3.0.42
19349,3.0.22
19354,3.0.23
19350,3.0.20
23367,4.9.0
19352,3.0.26
19342,3.0.27
19356,3.0.24
19351,3.0.25
