1766886557654
888,0.64.8
13126,0.64.8
18428,0.64.8
619,0.64.8
9179,0.64.8
5666,0.64.8
7998,0.64.8
6243,0.64.8
5770,0.64.8
13524,0.64.8
17653,0.64.8
